;----------------------------------------
; CMDBOOT.DEF module definition file v1.0
;----------------------------------------

NAME           CMDBOOT  WINDOWCOMPAT

DESCRIPTION    'Optional shell before WPS loads by Ryan C. Gordon, 1996.'
STACKSIZE      20000
STUB		   NONE
BASE=0x10000
PROTMODE

; end of cmdboot.def

